Shows how the current on-screen display settings will appear on your screen.


Volume level is displayed on screen whenever you adjust your volume using the volume keys (Fn+PgUp/PgDn).


Check this box to enable the on-screen display for speaker volume.


You can select the fonts used for the on-screen display.


You can select the size of on-screen display.


The on-screen display disapperes after a few seconds. You can select the time in seconds.


You can customize the color to complient your desktop background.


If this is checked, your computer will also beep whenever you adjust the volume.


Volume level is displayed on screen whenever you adjust your volume using the volume control buttons.


LCD screen brightness level is displayed on the screen when you adjust your LCD screen brightness by using the Fn+Home or Fn+End keys.


ThinkLight status is displayed on the screen when you turn the ThinkLight on or off by using the Fn+PgUp keys.


You can start an application by using the ThinkPad Button. Its name is displayed on the screen.


By using the Fn+F7 keys, you can display computer output on the external monitor, the LCD, or both when an external monitor is attached.

This is displayed when output is displayed on an external monitor.

This is displayed when output is displayed on the ThinkPad LCD.

This is displayed when output is displayed on an external monitor and the ThinkPad LCD.


You can customize the setting of the ThinkPad Button.