Copyright: Copyright IBM Corporation 1998 All Rights Reserved


A persistent localgroup is a unique localgroup alias that is defined on this NT server and is not synchronized with the domain controller.


A persistent user is a unique user account that is defined on this NT server and is not synchronized with the domain controller.


The list of localgroup aliases that will remain persistent on this NT server.  Persistent localgroup aliases are not synchronized with the domain controller.  The NT server system administrator must maintain persistent localgroup aliases.


The list of user accounts that will remain persistent on this NT server.  Persistent user accounts are not synchronized with the domain controller.  The NT server system administrator must maintain persistent user accounts.


IBM Networks User Account Manager for Windows NT

Copyright IBM Corp. 1998

Version 5.2


Lists the users and localgroups that will remain persistent on this NT server.  All other user accounts and localgroup aliases will be synchronized with the OS/2 Warp Server domain controller.


Type a user account name and then press the Add button to insert the name into the persistent users list.


Type a localgroup alias name and then press the Add button to insert the name into the persistent localgroup list.


 Check this box to request a complete synchronization of all user and group accounts from the OS/2 Warp Server domain controller.  Persistent users and localgroups will not be synchronized with the domain controller.


 Check this box to synchronize the NT Server system clock with the OS/2 Warp Server domain controller when the IBMLOGON service starts.